
    ARCHIVE DEVICE CONFIGURATION

    You can use this module to add backup devices to the system. The
    device can be a custom device, a reel to reel tape, a 1/4-inch
    cartridge tape, or a raw device type. The Archive Device
    Configuration window, as shown below, lists which devices are
    available for archiving data.

    From this window, you have the following options:

    + Add a device
    + Modify a device
    + Delete a device

    Add

    Click on the Add button to add a backup device. Enter the
    appropriate information in the Archive Device Add window, which is
    shown on the next page.

    Modify

    You can use this to view and/or modify the backup devices configured
    on your system. Highlight any logical device name you wish to
    modify, then click on the Modify button. A window will appear
    similar to the Archive Device Add window, except the Logical Device
    Name field is view-only.

    There are also two button differences in the Modify window:

    + you can use the Modify button (rather than the Add button) after
      you've made all your changes and

    + you can use the Next button to modify additional backup schedules
      if you've selected more than one backup to modify from the Add
      Device Configuration list.

    Delete

    Use the delete command to remove an Enlighten backup device from the
    system. Once a device has been removed, the only way to re-install
    it is to recreate the device, so use care with this command. To
    ensure the correct backup device is being deleted, Enlighten will
    prompt you for confirmation before deleting it.

